{\bfseries{Subpages}} 


\begin{DoxyItemize}
\item microcontroller Microcontroller
\end{DoxyItemize}

\DoxyHorRuler{0}
\hypertarget{resources_autotoc_md34}{}\doxysection{Altium Designer}\label{resources_autotoc_md34}
\hypertarget{resources_autotoc_md35}{}\doxysubsection{Learning Resources}\label{resources_autotoc_md35}

\begin{DoxyItemize}
\item \href{https://www.youtube.com/watch?v=HZIjYeVJXeU&list=PL3aaAq2OJU5H_V1wJfcxn9RtUf2hs2FU6}{\texttt{ Official You\+Tube Series}}
\end{DoxyItemize}\hypertarget{resources_autotoc_md36}{}\doxysubsection{Importing Schematics/\+Footprints/3\+D Models}\label{resources_autotoc_md36}

\begin{DoxyItemize}
\item \href{https://www.youtube.com/watch?v=6h-Z_NJibI8}{\texttt{ Instructional You\+Tube Video}}
\end{DoxyItemize}\hypertarget{resources_autotoc_md37}{}\doxysubsection{Tips}\label{resources_autotoc_md37}

\begin{DoxyItemize}
\item Altium seems to crash upon saving, most likely due to file names/paths being too long, and it not knowing how to handle it, then crashing.
\item Whitespace characters seem to be safe to use in your file paths.
\end{DoxyItemize}\hypertarget{resources_autotoc_md38}{}\doxysection{Texas Instruments MSP430 Universal Clock System (\+UCS)}\label{resources_autotoc_md38}

\begin{DoxyItemize}
\item \href{https://www.youtube.com/watch?v=b4PEmSDZml4}{\texttt{ High-\/level Introductory Video}} 
\end{DoxyItemize}