\label{index_md_README}%
\Hypertarget{index_md_README}%
\hypertarget{index_autotoc_md14}{}\doxysection{Documentation}\label{index_autotoc_md14}
For Documentation, we will use \char`\"{}doxygen\char`\"{} to easily create documentation pages for the project. This will be accessible in a variety of means, but primarily through HTML pages accessible through a browser, covering all aspects of the project.\hypertarget{index_autotoc_md15}{}\doxysubsection{Tips from Dr. Bazuin}\label{index_autotoc_md15}

\begin{DoxyItemize}
\item Make sub-\/circuits/sub-\/designs for schematics to keep things organized and modular/copy-\/able
\item We can sit-\/in on Sunseeker meetings
\item Need higher voltage for Lights from the supplied voltage of CANbus
\item Connecting crystal oscillators to MCU
\item A-\/213/\+A-\/216? has some power conversion example boards
\item Will Beringer(?) has schematics of DC-\/\+DC converters
\item MCU -\/ Test pins need to be connected for JTAG interface
\item MCU -\/ Have switch to short !\+RST pin on MCU with capacitors to allow the MCU to reset
\item MCU -\/ Oth port LED toggle
\item MCU -\/ Setup clock system with using SLAU208Q, page 161
\item MCU -\/ UART on SLAU208Q, page 939
\item Document things as we go
\item Need to make sure we have a BOM
\item Free samples for parts from manufacturers
\end{DoxyItemize}\hypertarget{index_autotoc_md16}{}\doxysubsection{Tips from Dr. Gomez}\label{index_autotoc_md16}

\begin{DoxyItemize}
\item Our requirements/specifications should be made to be more measurable
\item Need to design to safety standards, which need to be researched online 
\end{DoxyItemize}